   Detailed Results

Three types of detailed results reports can be generated.

1. Summary

This report is the same as the one on the Results screen with the
addition of a list of the Top Ten least reliable components.

2. Short

This report provides additional information about the components in each
class such as quantity, quality level and percentage contribution to
overall failure rate.

3. Complete

This report provides detailed information on each component type used
in each class allowing you to accurately pin-point 'PROBLEM' components.
endpage$

Printed results are sent to the parallel printer port. Only standard
ASCII characters are used so virtualy any printer will be satisfactory.
Be sure your printer is plugged in, switched on and on-line otherwise
RELIABILITY PREDICTOR will return an ERROR.

Don't worry, RELIABILITY PREDICTOR will not hang up or lose your data
if your printer is switched off. It just gives you an error message
and lets you try again.
